目录

简介

先决条件

要求

使用的组件

配置

许可

将您的帐户链接到SSE并注册设备。

将设备注册到SSE

简介

本文档介绍使用Firepower Firepower威胁防御(FTD)集成、验证和排除Cisco XDR故障所需的步骤。

先决条件

要求

Cisco 建议您了解以下主题：

- Firepower Management Center (FMC)

- Firepower Threat Defense (FTD)

- 映像的可选虚拟化

使用的组件

- Firepower威胁防御(FTD)- 6.5

- Firepower管理中心(FMC)- 6.5

- 安全服务交换(SSE)

- 思科XDR

- 智能许可证门户

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

配置

许可

虚拟帐户角色：

只有虚拟帐户管理员或智能帐户管理员有权将智能帐户与SSE帐户关联。

步骤1:要验证智能帐户角色，请导航至software.cisco.com，然后在Administration Menu下选择Manage Smart Account。

第二步：要验证用户角色，请导航到Users，并验证在Roles下，帐户设置为具有虚拟帐户管理员，如图所示。

第三步：确保选择在SSE上链接的虚拟帐户包含安全设备的许可证，如果不包含安全许可证的帐户在SSE上链接，则安全设备和事件不会显示在SSE门户上。

第四步：要验证FMC是否已注册到正确的虚拟帐户，请导航到系统>许可证>智能许可证：

将您的帐户链接到SSE并注册设备。

步骤1:登录SSE帐户时，必须将智能帐户链接到SSE帐户，为此，您需要点击工具图标并选择Link Accounts。

帐户链接后，您会看到智能帐户及其上的所有虚拟帐户。

将设备注册到SSE

步骤1:确保您的环境中允许以下URL:

美国地区

- api-sse.cisco.com

- eventing-ingest.sse.itd.cisco.com

欧盟地区

- api.eu.ss e.itd.cisco.com

- eventing-ingest.eu.ss e.itd.cisco.com

APJ地区

- api.apj.sse.itd.cisco.com

- eventing-ingest.apj.sse.itd.cisco.com

第二步：使用此URL https://admin.sse.itd.cisco.com登录SSE门户，导航到云服务，并启用事件和思科XDR威胁响应这两个选项，如下图所示：

第三步：登录到Firepower管理中心并导航到System>Integration>Cloud Services，启用Cisco Cloud Event Configuration，然后选择要发送到云的事件：

第四步：您可以返回到SSE门户并验证现在是否可以看到在SSE上注册的设备：

Events由FTD设备发送，导航至SSE门户上的Events以验证设备发送到SSE的事件，如图所示：

验证

验证FTD是否生成事件（恶意软件或入侵），对于入侵事件，请导航到Analysis>Files>Malware Events，对于入侵事件，请导航到Analysis>Intrusion>Events。

按照向SSE注册设备第4部分所述，验证在SSE门户上注册的事件。

验证信息是否显示在Cisco XDR控制面板上，或者检查API日志，以便查看可能的API故障原因。

故障排除

检测连接问题

您可以从action_queue.log文件中检测一般连接问题。如果发生故障，您可以在文件中看到此类日志：

ActionQueueScrape.pl[19094]: [SF::SSE::Enrollment] canConnect: System (/usr/bin/curl -s --connect-timeout 10 -m 20 -L --max-redirs 5 --max-filesize 104857600 --capath /ngfw/etc/sf/keys/fireamp/thawte_roots -f https://api.eu.sse.itd.cisco.com/providers/sse/api/v1/regions) Failed, curl returned 28 at /ngfw/usr/local/sf/lib/perl/5.10.1/SF/System.pmline 10477.

在这种情况下，退出代码28表示操作超时，我们必须检查与Internet的连接。您还必须看到退出代码6，这意味着存在DNS解析问题

DNS解析引起的连接问题

步骤1:检查连接是否工作正常。

root@ftd01:~# curl -v -k https://api-sse.cisco.com

* Rebuilt URL to: https://api-sse.cisco.com/

* getaddrinfo(3) failed for api-sse.cisco.com:443

* Couldn't resolve host 'api-sse.cisco.com'

* Closing connection 0

curl: (6) Couldn't resolve host 'api-sse.cisco.com'

此输出显示设备无法解析URL https://api-sse.cisco.com，在这种情况下，我们需要验证是否配置了正确的DNS服务器，它可以通过专家CLI中的nslookup进行验证：

root@ftd01:~# nslookup api-sse.cisco.com

;; connection timed out; no servers could be reached

此输出显示未到达配置的DNS，为了确认DNS设置，请使用show network命令：

> show network

===============[ System Information ]===============

Hostname                  : ftd01

DNS Servers               : x.x.x.10

Management port           : 8305

IPv4 Default route

Gateway                   : x.x.x.1

======================[ eth0 ]======================

State                     : Enabled

Link                      : Up

Channels                  : Management & Events

Mode                      : Non-Autonegotiation

MDI/MDIX                  : Auto/MDIX

MTU                       : 1500

MAC Address               : x:x:x:x:9D:A5

----------------------[ IPv4 ]----------------------

Configuration             : Manual

Address                   : x.x.x.27

Netmask                   : 255.255.255.0

Broadcast                 : x.x.x.255

----------------------[ IPv6 ]----------------------

Configuration             : Disabled

===============[ Proxy Information ]================

State                     : Disabled

Authentication            : Disabled

在本示例中，使用了错误的DNS服务器，您可以使用以下命令更改DNS设置：

> configure network dns x.x.x.11

在可以再次测试此连接之后，这次连接成功。

root@ftd01:~# curl -v -k https://api-sse.cisco.com

* Rebuilt URL to: https://api-sse.cisco.com/

* Trying x.x.x.66...

* Connected to api-sse.cisco.com (x.x.x.66) port 443 (#0)

* ALPN, offering http/1.1

* Cipher selection: ALL:!EXPORT:!EXPORT40:!EXPORT56:!aNULL:!LOW:!RC4:@STRENGTH

* successfully set certificate verify locations:

* CAfile: none

CApath: /etc/ssl/certs

* TLSv1.2 (OUT), TLS header, Certificate Status (22):

* TLSv1.2 (OUT), TLS handshake, Client hello (1):

* TLSv1.2 (IN), TLS handshake, Server hello (2):

* TLSv1.2 (IN), TLS handshake, Certificate (11):

* TLSv1.2 (IN), TLS handshake, Server key exchange (12):

* TLSv1.2 (IN), TLS handshake, Request CERT (13):

* TLSv1.2 (IN), TLS handshake, Server finished (14):

* TLSv1.2 (OUT), TLS handshake, Certificate (11):

* TLSv1.2 (OUT), TLS handshake, Client key exchange (16):

* TLSv1.2 (OUT), TLS change cipher, Client hello (1):

* TLSv1.2 (OUT), TLS handshake, Finished (20):

* TLSv1.2 (IN), TLS change cipher, Client hello (1):

* TLSv1.2 (IN), TLS handshake, Finished (20):

* SSL connection using TLSv1.2 / ECDHE-RSA-AES128-GCM-SHA256

* ALPN, server accepted to use http/1.1

* Server certificate:

* subject: C=US; ST=California; L=San Jose; O=Cisco Systems, Inc.; CN=api -sse.cisco.com

* start date: 2019-12-03 20:57:56 GMT

* expire date: 2021-12-03 21:07:00 GMT

* issuer: C=US; O=HydrantID (Avalanche Cloud Corporation); CN=HydrantID S SL ICA G2

* SSL certificate verify result: self signed certificate in certificate c hain (19), continuing anyway.

> GET / HTTP/1.1

> Host: api-sse.cisco.com

> User-Agent: curl/7.44.0

> Accept: */*

>

< HTTP/1.1 403 Forbidden

< Date: Wed, 08 Apr 2020 01:27:55 GMT

< Content-Type: text/plain; charset=utf-8

< Content-Length: 9

< Connection: keep-alive

< Keep-Alive: timeout=5

< ETag: "5e17b3f8-9"

< Cache-Control: no-store

< Pragma: no-cache

< Content-Security-Policy: default-src 'self'

< X-Content-Type-Options: nosniff

< X-XSS-Protection: 1; mode=block

< Strict-Transport-Security: max-age=31536000; includeSubdomains;

SSE门户的注册问题

FMC和FTD都需要在其管理接口上连接到SSE URL，要测试连接，请在具有根访问权限的Firepower CLI上输入以下命令：

curl -v https://api-sse.cisco.com/providers/sse/services/registration/api/v2/clients --cacert /ngfw/etc/ssl/connectorCA.pem

curl -v https://est.sco.cisco.com --cacert /ngfw/etc/ssl/connectorCA.pem

curl -v https://eventing-ingest.sse.itd.cisco.com --cacert /ngfw/etc/ssl/connectorCA.pem

curl -v https://mx01.sse.itd.cisco.com --cacert /ngfw/etc/ssl/connectorCA.pem

可以使用以下命令绕过证书检查：

root@ftd01:~# curl -v -k https://api-sse.cisco.com

* Rebuilt URL to: https://api-sse.cisco.com/

* Trying x.x.x.66...

* Connected to api-sse.cisco.com (x.x.x.66) port 443 (#0)

* ALPN, offering http/1.1

* Cipher selection: ALL:!EXPORT:!EXPORT40:!EXPORT56:!aNULL:!LOW:!RC4:@STRENGTH

* successfully set certificate verify locations:

* CAfile: none

CApath: /etc/ssl/certs

* TLSv1.2 (OUT), TLS header, Certificate Status (22):

* TLSv1.2 (OUT), TLS handshake, Client hello (1):

* TLSv1.2 (IN), TLS handshake, Server hello (2):

* TLSv1.2 (IN), TLS handshake, Certificate (11):

* TLSv1.2 (IN), TLS handshake, Server key exchange (12):

* TLSv1.2 (IN), TLS handshake, Request CERT (13):

* TLSv1.2 (IN), TLS handshake, Server finished (14):

* TLSv1.2 (OUT), TLS handshake, Certificate (11):

* TLSv1.2 (OUT), TLS handshake, Client key exchange (16):

* TLSv1.2 (OUT), TLS change cipher, Client hello (1):

* TLSv1.2 (OUT), TLS handshake, Finished (20):

* TLSv1.2 (IN), TLS change cipher, Client hello (1):

* TLSv1.2 (IN), TLS handshake, Finished (20):

* SSL connection using TLSv1.2 / ECDHE-RSA-AES128-GCM-SHA256

* ALPN, server accepted to use http/1.1

* Server certificate:

* subject: C=US; ST=California; L=San Jose; O=Cisco Systems, Inc.; CN=api -sse.cisco.com

* start date: 2019-12-03 20:57:56 GMT

* expire date: 2021-12-03 21:07:00 GMT

* issuer: C=US; O=HydrantID (Avalanche Cloud Corporation); CN=HydrantID S SL ICA G2

* SSL certificate verify result: self signed certificate in certificate c hain (19), continuing anyway.

> GET / HTTP/1.1

> Host: api-sse.cisco.com

> User-Agent: curl/7.44.0

> Accept: */*

>

< HTTP/1.1 403 Forbidden

< Date: Wed, 08 Apr 2020 01:27:55 GMT

< Content-Type: text/plain; charset=utf-8

< Content-Length: 9

< Connection: keep-alive

< Keep-Alive: timeout=5

< ETag: "5e17b3f8-9"

< Cache-Control: no-store

< Pragma: no-cache

< Content-Security-Policy: default-src 'self'

< X-Content-Type-Options: nosniff

< X-XSS-Protection: 1; mode=block

< Strict-Transport-Security: max-age=31536000; includeSubdomains;

注意：您将收到403 Forbidden消息，因为从测试发送的参数不是SSE期望的值，但是这足以验证连接。

检验SSEConnector状态

可以验证连接器属性，如下所示。

# more /ngfw/etc/sf/connector.properties

registration_interval=180

connector_port=8989

connector_fqdn=api-sse.cisco.com

为了检查SSConnector和EventHandler之间的连接，可以使用此命令，以下是连接错误的示例：

root@firepower:/etc/sf# netstat -anlp | grep EventHandler_SSEConnector.sock

unix 2 [ ACC ] STREAM LISTENING 3022791165 11204/EventHandler /ngfw/var/sf/run/EventHandler_SSEConnector.sock

在已建立的连接示例中，您可以看到流状态为connected:

root@firepower:/etc/sf# netstat -anlp | grep EventHandler_SSEConnector.sock

unix 2 [ ACC ] STREAM LISTENING 382276 7741/EventHandler /ngfw/var/sf/run/EventHandler_SSEConnector.sock

unix 3 [ ] STREAM CONNECTED 378537 7741/EventHandler /ngfw/var/sf/run/EventHandler_SSEConnector.soc

验证发送到SSE门户和CTR的数据

要从FTD设备发送事件以查看TCP连接需要与https://eventing-ingest.sse.itd.cisco.com建立。以下是SSE门户和FTD之间未建立连接的示例：

root@firepower:/ngfw/var/log/connector# lsof -i | grep conn

connector 60815 www 10u IPv4 3022789647 0t0 TCP localhost:8989 (LISTEN)

connector 60815 www 12u IPv4 110237499 0t0 TCP firepower.cisco.com:53426->ec2-100-25-93-234.compute-1.amazonaws.com:https (SYN_SENT)

在connector.log日志中：

time="2020-04-13T14:34:02.88472046-05:00" level=error msg="[firepower.cisco.com][events.go:90 events:connectWebSocket] dial tcp x.x.x.246:443: getsockopt: connection timed out"

time="2020-04-13T14:38:18.244707779-05:00" level=error msg="[firepower.cisco.com][events.go:90 events:connectWebSocket] dial tcp x.x.x.234:443: getsockopt: connection timed out"

time="2020-04-13T14:42:42.564695622-05:00" level=error msg="[firepower.cisco.com][events.go:90 events:connectWebSocket] dial tcp x.x.x.246:443: getsockopt: connection timed out"

time="2020-04-13T14:47:48.484762429-05:00" level=error msg="[firepower.cisco.com][events.go:90 events:connectWebSocket] dial tcp x.x.x.234:443: getsockopt: connection timed out"

time="2020-04-13T14:52:38.404700083-05:00" level=error msg="[firepower.cisco.com][events.go:90 events:connectWebSocket] dial tcp x.x.x.234:443: getsockopt: connection timed out"

注：注意，显示的IP地址x.x.x.246和1x.x.x.246属于https://eventing-ingest.sse.itd.cisco.com必须更改，因此建议根据URL而不是IP地址允许流量进入SSE门户。

如果此连接未建立，则事件不会发送到SSE门户。以下是FTD和SSE门户之间已建立连接的示例：

root@firepower:# lsof -i | grep conn

connector 13277   www   10u  IPv4 26077573      0t0  TCP localhost:8989 (LISTEN)

connector 13277   www   19u  IPv4 26077679      0t0  TCP x.x.x.200:56495->ec2-35-172-147-246.compute-1.amazonaws.com:https (ESTABLISHED)