Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Material de Suporte

Configurar

Diagrama de Rede

Configurações

Verificar

Comandos show do Catalyst 2948G

Comandos show do Catalyst 2948G-L3

Troubleshoot

Informações Relacionadas

Introduction

Este documento discute e fornece uma configuração de exemplo do Fast EtherChannel (FEC) e do entroncamento 802.1Q entre um switch Catalyst 2948G-L3 que executa o software Cisco IOS® e os switches que executam o CatalystOS (todos os modelos, inclusive os switches das séries Catalyst 4000, 5000, e 6000).

Prerequisites

Requirements

Para obter uma lista de switches Catalyst que suportam encapsulamentos de entroncamento 802.1Q e ISL, consulte Requisitos do sistema para implementar o entroncamento.

Há algumas diretrizes para a configuração do EtherChannel e do entroncamento. Consulte a documentação do software do seu switch. Por exemplo, se você estiver executando o Catalyst OS (CatOS) Software Release 8.2.x em um Catalyst 6500/6000, consulte o Catalyst 6500 Series Software Configuration Guide, 8.2 e examine cuidadosamente quaisquer diretrizes e restrições de configuração nas seções Configurando Troncos VLAN Ethernet e Configurando EtherChannel.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- Catalyst 2948G com CatOS 7.1.2 instalado (somente 802.1Q)

- Catalyst 2948G-L3 com software Cisco IOS versão 12.0(14)W5(20) instalado

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Material de Suporte

O uso do EtherChannel pode fornecer maior largura de banda e redundância. O EtherChannel é conveniente porque ele dimensiona a largura de banda sem aumentar a complexidade do projeto. A árvore de abrangência trata o pacote EtherChannel como um único enlace, por isso, nenhum loop é introduzido. Os Routing Protocols também tratam o EtherChannel como uma única interface roteada, com um IP Address comum. O empacotamento EtherChannel oferece FEC de até 1600 Mbps (Fast EtherChannel), full-duplex ou Gigabit EtherChannel (GEC) de 16 Gbps. O truncamento conduz o tráfego de vários VLANs por um enlace ponto-a-ponto entre dois dispositivos. Dois métodos de entroncamento são o Inter-Switch Link Protocol (ISL, um protocolo proprietário da Cisco) ou 802.1Q (um padrão IEEE). Este documento trata especificamente do truncamento 802.1Q.

Configurar

In this section, the configurations presented will include a four-port FEC and 802.1Q trunk between the 2948G-L3 and a CatOS Switch.

Observação: para encontrar informações adicionais sobre os comandos neste documento, use a Command Lookup Tool (somente clientes registrados) .

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Configurações

Este documento utiliza as seguintes configurações:

- Catalyst 2948G

- Catalyst 2948G-L3

Catalyst 2948G

CatOS (enable) show config

This command shows non-default configurations only.

Use 'show config all' to show both default and non-default

configurations.

............

.......................

..

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Thu Nov 21 2002, 15:24:27

!

#version 7.1(2)

!

!

#system web interface version(s)

set prompt CatOS

!

#test

!

#frame distribution method

set port channel all distribution mac both

!

#ip

set interface sc0 1 10.10.10.1/255.255.255.0 10.10.10.255

set interface sl0 down

set interface me1 down

set ip alias default         0.0.0.0

set ip alias cat             10.10.10.2

!

#spantree

#vlan                         <VlanID>

!

#set boot command

set boot config-register 0x2102

clear boot system all

!

!--- Ports 2/1 to 2/4 are assigned to a port channel.

#port channel

set port channel 2/1-4 29

!

#multicast filter

set igmp filter disable

!

#module 1 : 0-port Switching Supervisor

!

!--- The trunking mode is specified as 802.1Q, because it !--- is the only encapsulation that is supported on the !--- 2948G. The mode is set to nonegotiate, because the !--- 2948G-L3 does not support Dynamic Trunking Protocol (DTP).

#module 2 : 50-port 10/100/1000 Ethernet

set trunk 2/1  nonegotiate 802.1Q 1-1005

set trunk 2/2  nonegotiate 802.1Q 1-1005

set trunk 2/3  nonegotiate 802.1Q 1-1005

set trunk 2/4  nonegotiate 802.1Q 1-1005

!--- The channel mode is set to on, because 2948G-L3 !--- does not support Port Aggregation Protocol (PAgP).

set port channel 2/1-4 mode on

end

Catalyst 2948G-L3

2948G-L3# show run

Building configuration...

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 2948G-L3

!

enable secret 5 $1$bNvR$33puy1WCyrdKMvlnj61Js.

!

ip subnet-zero

!

!

!--- The logical port-channel interface must be created !--- before you put the physical interfaces into the !--- channel group.interface port-channel1.

no ip address

no ip directed-broadcast

hold-queue 300 in

!

!--- Specify the native VLAN: VLAN 1 in this example, !--- which is the default. For performance and security !--- reasons, it is recommended that you keep the user !--- traffic off of the native or management VLAN.

interface Port-channel1.1

encapsulation 802.1Q 1 native

ip address 10.10.10.2 255.255.255.0

no ip redirects

no ip directed-broadcast

!

interface Port-channel1.2

encapsulation 802.1Q 2

ip address 10.10.11.2 255.255.255.0

no ip directed-broadcast

!

!--- Specify all of the physical ports that are part !--- of the logical port channel interface.

interface FastEthernet1

no ip address

no ip directed-broadcast

channel-group 1

!

interface FastEthernet2

no ip address

no ip directed-broadcast

channel-group 1

!

interface FastEthernet3

no ip address

no ip directed-broadcast

channel-group 1

!

interface FastEthernet4

no ip address

no ip directed-broadcast

channel-group 1

!

!--- Output suppressed.

!

ip classless

!

!

line con 0

transport input none

line aux 0

line vty 0 4

password cisco

login

!

end

Verificar

Esta seção fornece informações para confirmar se sua configuração está funcionando corretamente.

Comandos show do Catalyst 2948G

- show port channel — Exibe informações do EtherChannel. Exibe também o balanceamento de carga ou oesquema de distribuição de estrutura, a porta e as informações do canal de porta.

!--- Verify that the port channel is UP (connected, on) and that !--- all the physical ports are members (channel ID).

CatOS (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

2/1  connected  on                      29   801

2/2  connected  on                      29   801

2/3  connected  on                      29   801

2/4  connected  on                      29   801

Port  Device-ID                       Port-ID                Platform

----- ------------------------------- ---------------------- --------------

2/1  2948G-L3                        FastEthernet1          cisco Cat2948G

2/2   Not directly connected to switch

2/3  2948G-L3                        FastEthernet3          cisco Cat2948G

2/4  2948G-L3                        FastEthernet4          cisco Cat2948G

Observação: é normal que a porta 2/2 não esteja diretamente conectada ao switch. A saída do comando show port channel no switch que está conectado a um roteador normalmente se parece com este exemplo. Como o roteador não participa do PAgP (usado para negociar canais) e a canalização está ativada, as portas mostram as informações do vizinho FEC usando os dados do Cisco Discovery Protocol (CDP). O software Cisco IOS envia pacotes CDP na interface do canal e nas interfaces físicas. Uma das portas do Catalyst vê vários vizinhos e relatórios CDP não conectados diretamente ao Switch. Este é um problema superficial e mais informações estão disponíveis no Cisco Bug ID CSCdp04017 (somente clientes registrados) .

- show port channel statistics — Exibe o grupo administrativo do canal de porta e exibe se PAgP está em uso no canal de porta.

Verifique se PAgP não está em uso nos links.

CatOS (enable) show port channel status

Port  Admin   PAgP Pkts   PAgP Pkts PAgP Pkts PAgP Pkts PAgP Pkts PAgP Pkts

Group   Transmitted Received  InFlush   RetnFlush OutFlush  InError

----- ------- ----------- --------- --------- --------- --------- ---------

2/1       29           0         0         0         0         0         0

2/2       29           0         0         0         0         0         0

2/3       29           0         0         0         0         0         0

2/4       29           0         0         0         0         0         0

- show trunk —Exibe o modo de truncamento, o encapsulamento e a VLAN nativa.

Verifique se o entroncamento está ativado nas interfaces físicas e na interface port channel. Além disso, verifique se o modo de entroncamento está definido corretamente como não negociado.

Observação: em um tronco 802.1Q, a VLAN nativa deve corresponder em ambos os lados.

CatOS (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

2/1      nonegotiate  802.1Q          trunking      1

2/2      nonegotiate  802.1Q          trunking      1

2/3      nonegotiate  802.1Q          trunking      1

2/4      nonegotiate  802.1Q          trunking      1

Port      Vlans allowed on trunk

--------  -----------------------------------------------------------------

2/1      1-1005

2/2      1-1005

2/3      1-1005

2/4      1-1005

Port      Vlans allowed and active in management domain

--------  -----------------------------------------------------------------

2/1      1

2/2      1

2/3      1

2/4      1

Port      Vlans in spanning tree forwarding state and not pruned

--------  -----------------------------------------------------------------

2/1      1

2/2      1

2/3      1

2/4      1

Comandos show do Catalyst 2948G-L3

- show interfaces port-channel 1 —Fornece o status do port channel e das portas que são membros do port channel group.

Verifique se todas as interfaces físicas que fazem parte do EtherChannel podem ser vistas como membros.

2948G-L3# show interfaces port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0008.a308.1c07 (bia 0000.0000.0000)

MTU 1500 bytes, BW 400000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set, keepalive set (10 sec)

Half-duplex, Unknown Speed, Media type unknown

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 4

Member 0 : FastEthernet2

Member 1 : FastEthernet1

Member 2 : FastEthernet4

Member 3 : FastEthernet3

Last input 00:00:00, output 00:00:55, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/300, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

596128 packets input, 50714549 bytes, 0 no buffer

Received 7 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

0 watchdog, 0 multicast

0 input packets with dribble condition detected

44294 packets output, 17498215 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

- show cdp neighbor —Lista todos os dispositivos Cisco diretamente conectados que são descobertos através do CDP.

Verifique se o switch na outra extremidade está visível através de todas as portas físicas.

2948G-L3# show cdp neighbor

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater

Device ID        Local Intrfce     Holdtme    Capability  Platform  Port ID

JAB032400H2      Port-channel1.1    126         T S       WS-C2948  2/3

JAB032400H2      Port-channel1.1    124         T S       WS-C2948  2/4

JAB032400H2      Port-channel1.1    123         T S       WS-C2948  2/1

JAB032400H2      Port-channel1.1    123         T S       WS-C2948  2/2

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Informações Relacionadas

- Configurando o ISL e o entroncamento 802.1q entre um Switch CatOS e um roteador externo (roteamento de InterVLAN)

- Configurações de exemplo do Catalyst 2948G-L3 – VLAN único, multi-VLAN e camada de distribuição de multi-VLAN conectando ao centro da rede

- Troubleshooting de Hardware de Catalyst 2948G-L3/4908G-L3 Series Switches

- Suporte a Produtos de LAN

- Suporte de tecnologia de switching de LAN

- Suporte Técnico e Documentação - Cisco Systems