内容

概要

前提条件

要件

使用するコンポーネント

設定

ネットワーク図

FMCによるAAA/RADIUS認証を使用したリモートアクセスVPNの設定

ISE（RADIUSサーバ）での認可ポリシーの設定

確認

トラブルシュート

概要

このドキュメントでは、Identity Services Engine(ISE)サーバを使用してRADIUS認可を設定し、RADIUS属性8 Framed-IP-Addressを使用して、特定のCisco AnyConnectセキュアモビリティクライアントユーザのFirepower Threat Defense(FTD)に常に転送する方法についてを説明します。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- FTD

- Firepower Management Center（FMC）

- ISE

- Cisco AnyConnect セキュア モビリティ クライアント

- RADIUS プロトコル

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアのバージョンに基づいています。

- FMCv - 7.0.0（ビルド94）

- FTDv - 7.0.0（ビルド94）

- ISE:2.7.0.356

- AnyConnect - 4.10.02086

- Windows 10 Pro

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

設定

ネットワーク図

FMCによるAAA/RADIUS認証を使用したリモートアクセスVPNの設定

手順については、次のドキュメントとビデオを参照してください。

- FTD での AnyConnect Remote Access VPN の設定

- FMCによって管理されるFTDの初期AnyConnect設定

FTD CLIでのリモート・アクセスVPNの構成：

ip local pool AC_Pool 10.0.50.1-10.0.50.100 mask 255.255.255.0

interface GigabitEthernet0/0

nameif Outside_Int

security-level 0

ip address 192.168.0.100 255.255.255.0

aaa-server ISE_Server protocol radius

aaa-server ISE_Server host 172.16.0.8

key *****

authentication-port 1812

accounting-port 1813

crypto ca trustpoint RAVPN_Self-Signed_Cert

enrollment self

fqdn none

subject-name CN=192.168.0.100

keypair <Default-RSA-Key>

crl configure

ssl trust-point RAVPN_Self-Signed_Cert

webvpn

enable Outside_Int

http-headers

hsts-server

enable

max-age 31536000

include-sub-domains

no preload

hsts-client

enable

x-content-type-options

x-xss-protection

content-security-policy

anyconnect image disk0:/csm/anyconnect-win-4.10.02086-webdeploy-k9.pkg 1 regex "Windows"

anyconnect enable

tunnel-group-list enable

cache

no disable

error-recovery disable

group-policy DfltGrpPolicy attributes

vpn-tunnel-protocol ikev2 ssl-client

user-authentication-idle-timeout none

webvpn

anyconnect keep-installer none

anyconnect modules value none

anyconnect ask none default anyconnect

http-comp none

activex-relay disable

file-entry disable

file-browsing disable

url-entry disable

deny-message none

tunnel-group RA_VPN type remote-access

tunnel-group RA_VPN general-attributes

address-pool AC_Pool

authentication-server-group ISE_Server

tunnel-group RA_VPN webvpn-attributes

group-alias RA_VPN enable

ISE（RADIUSサーバ）での認可ポリシーの設定

ステップ1:ISEサーバにログインし、[Administration] > [Network Resources] > [Network Devices]に移動します。

ステップ2:[Network Devices]セクションで[Add]をクリックし、ISEがFTDからのRADIUSアクセス要求を処理できるようにします。

ネットワークデバイスの[名前]フィールドと[IPアドレス]フィールドを入力し、[RADIUS Authentication Settings]ボックスをオンにします。[Shared Secret]は、FMC上のRADIUSサーバオブジェクトの作成時に使用された値と同じである必要があります。

このページの最後にあるボタンで保存します。

ステップ3:[Administration] > [Identity Management] > [Identities]に移動します。

ステップ4:[Network Access Users]セクションで、[Add]をクリックしてISEのローカルデータベースにuser1を作成します。

[名前]フィールドと[ログインパスワード]フィールドにユーザ名とパスワードを入力し、[送信]をクリックします。

ステップ5：前のステップを繰り返して、user2を作成します。

ステップ6:[Policy] > [Policy Sets]に移動します。

ステップ7：画面の右側にある矢印をクリックします。

ステップ8:[Authorization Policy]の横にある矢印>をクリックして、[Authorization Policy]を展開します。次に、+記号をクリックして新しい規則を追加します。

ルールに名前を付け、[条件]列の下の+記号を選択します。

[Attribute Editor]テキストボックスをクリックし、[Subject]アイコンをクリックします。[RADIUS User-Name]属性が見つかるまで下にスクロールし、それを選択します。

演算子として[等しい]を選択し、その横のテキストボックスにuser1と入力します。[Use]をクリックし、属性を保存します。

これで、このルールの条件が設定されました。

ステップ9:[Results/Profiles]列で、+記号をクリックし、[Create a New Authorization Profile]を選択します。

名前を指定し、ACCESS_ACCEPTをアクセスタイプとして保持します。[Advance Attributes Settings]セクションまでスクロールダウンします。

オレンジ色の矢印をクリックし、[Radius] > [Framed-IP-Address—[8]を選択します。

このユーザーに常に静的に割り当てるIPアドレスを入力し、[保存]をクリックします。

ステップ10：ここで、新しく作成した認可プロファイルを選択します。

これで、認可ルールがすべて設定されました。[Save] をクリックします。

確認

ステップ1:Cisco AnyConnectセキュアモビリティクライアントがインストールされているクライアントマシンに移動します。FTDヘッドエンド（ここではWindowsマシンを使用）に接続し、user1クレデンシャルを入力します。

歯車のアイコン（左下の角）をクリックして、[Statistics] タブに移動します。[Address Information]セクションで、割り当てられたIPアドレスが、このユーザのISE認証ポリシーで設定されているIPアドレスであることを確認します。

FTDでのdebug radius allコマンドの出力は次のとおりです。

firepower# SVC message: t/s=5/16: The user has requested to disconnect the connection.

webvpn_svc_np_tear_down: no ACL

webvpn_svc_np_tear_down: no IPv6 ACL

np_svc_destroy_session(0x9000)

radius mkreq: 0x13

alloc_rip 0x0000145d043b6460

new request 0x13 --> 3 (0x0000145d043b6460)

got user 'user1'

got password

add_req 0x0000145d043b6460 session 0x13 id 3

RADIUS_REQUEST

radius.c: rad_mkpkt

rad_mkpkt: ip:source-ip=192.168.0.101

RADIUS packet decode (authentication request)

RADIUS packet decode (response)

--------------------------------------

Raw packet data (length = 136).....

02 03 00 88 0c af 1c 41 4b c4 a6 58 de f3 92 31 | .......AK..X...1

7d aa 38 1e 01 07 75 73 65 72 31 08 06 0a 00 32 | }.8...user1....2

65 19 3d 43 41 43 53 3a 63 30 61 38 30 30 36 34 | e.=CACS:c0a80064

30 30 30 30 61 30 30 30 36 31 34 62 63 30 32 64 | 0000a000614bc02d

3a 64 72 69 76 65 72 61 70 2d 49 53 45 2d 32 2d | :driverap-ISE-2-

37 2f 34 31 37 34 39 34 39 37 38 2f 32 31 1a 2a | 7/417494978/21.*

00 00 00 09 01 24 70 72 6f 66 69 6c 65 2d 6e 61 | .....$profile-na

6d 65 3d 57 69 6e 64 6f 77 73 31 30 2d 57 6f 72 | me=Windows10-Wor

6b 73 74 61 74 69 6f 6e | kstation

Parsed packet data.....

Radius: Code = 2 (0x02)

Radius: Identifier = 3 (0x03)

Radius: Length = 136 (0x0088)

Radius: Vector: 0CAF1C414BC4A658DEF392317DAA381E

Radius: Type = 1 (0x01) User-Name

Radius: Length = 7 (0x07)

Radius: Value (String) =

75 73 65 72 31 | user1

Radius: Type = 8 (0x08) Framed-IP-Address

Radius: Length = 6 (0x06)

Radius: Value (IP Address) = 10.0.50.101 (0x0A003265)

Radius: Type = 25 (0x19) Class

Radius: Length = 61 (0x3D)

Radius: Value (String) =

43 41 43 53 3a 63 30 61 38 30 30 36 34 30 30 30 | CACS:c0a80064000

30 61 30 30 30 36 31 34 62 63 30 32 64 3a 64 72 | 0a000614bc02d:dr

69 76 65 72 61 70 2d 49 53 45 2d 32 2d 37 2f 34 | iverap-ISE-2-7/4

31 37 34 39 34 39 37 38 2f 32 31 | 17494978/21

Radius: Type = 26 (0x1A) Vendor-Specific

Radius: Length = 42 (0x2A)

Radius: Vendor ID = 9 (0x00000009)

Radius: Type = 1 (0x01) Cisco-AV-pair

Radius: Length = 36 (0x24)

Radius: Value (String) =

70 72 6f 66 69 6c 65 2d 6e 61 6d 65 3d 57 69 6e | profile-name=Win

64 6f 77 73 31 30 2d 57 6f 72 6b 73 74 61 74 69 | dows10-Workstati

6f 6e | on

rad_procpkt: ACCEPT

Got AV-Pair with value profile-name=Windows10-Workstation

RADIUS_ACCESS_ACCEPT: normal termination

RADIUS_DELETE

remove_req 0x0000145d043b6460 session 0x13 id 3

free_rip 0x0000145d043b6460

radius: send queue empty

FTD のログは次のとおりです。

firepower#

<omitted output>

Sep 22 2021 23:52:40: %FTD-6-725002: Device completed SSL handshake with client Outside_Int:192.168.0.101/60405 to 192.168.0.100/443 for TLSv1.2 session

Sep 22 2021 23:52:48: %FTD-7-609001: Built local-host Outside_Int:172.16.0.8

Sep 22 2021 23:52:48: %FTD-6-113004: AAA user authentication Successful : server = 172.16.0.8 : user = user1

Sep 22 2021 23:52:48: %FTD-6-113009: AAA retrieved default group policy (DfltGrpPolicy) for user = user1

Sep 22 2021 23:52:48: %FTD-6-113008: AAA transaction status ACCEPT : user = user1

Sep 22 2021 23:52:48: %FTD-7-734003: DAP: User user1, Addr 192.168.0.101: Session Attribute aaa.radius["1"]["1"] = user1

Sep 22 2021 23:52:48: %FTD-7-734003: DAP: User user1, Addr 192.168.0.101: Session Attribute aaa.radius["8"]["1"] = 167785061

Sep 22 2021 23:52:48: %FTD-7-734003: DAP: User user1, Addr 192.168.0.101: Session Attribute aaa.radius["25"]["1"] = CACS:c0a800640000c000614bc1d0:driverap-ISE-2-7/417494978/23

Sep 22 2021 23:52:48: %FTD-7-734003: DAP: User user1, Addr 192.168.0.101: Session Attribute aaa.cisco.grouppolicy = DfltGrpPolicy

Sep 22 2021 23:52:48: %FTD-7-734003: DAP: User user1, Addr 192.168.0.101: Session Attribute aaa.cisco.ipaddress = 10.0.50.101

Sep 22 2021 23:52:48: %FTD-7-734003: DAP: User user1, Addr 192.168.0.101: Session Attribute aaa.cisco.username = user1

Sep 22 2021 23:52:48: %FTD-7-734003: DAP: User user1, Addr 192.168.0.101: Session Attribute aaa.cisco.username1 = user1

Sep 22 2021 23:52:48: %FTD-7-734003: DAP: User user1, Addr 192.168.0.101: Session Attribute aaa.cisco.username2 =

Sep 22 2021 23:52:48: %FTD-7-734003: DAP: User user1, Addr 192.168.0.101: Session Attribute aaa.cisco.tunnelgroup = RA_VPN

Sep 22 2021 23:52:48: %FTD-6-734001: DAP: User user1, Addr 192.168.0.101, Connection AnyConnect: The following DAP records were selected for this connection: DfltAccessPolicy

Sep 22 2021 23:52:48: %FTD-6-113039: Group <DfltGrpPolicy> User <user1> IP <192.168.0.101> AnyConnect parent session started.

<omitted output>

Sep 22 2021 23:53:17: %FTD-6-725002: Device completed SSL handshake with client Outside_Int:192.168.0.101/60412 to 192.168.0.100/443 for TLSv1.2 session

Sep 22 2021 23:53:17: %FTD-7-737035: IPAA: Session=0x0000c000, 'IPv4 address request' message queued

Sep 22 2021 23:53:17: %FTD-7-737035: IPAA: Session=0x0000c000, 'IPv6 address request' message queued

Sep 22 2021 23:53:17: %FTD-7-737001: IPAA: Session=0x0000c000, Received message 'IPv4 address request'

Sep 22 2021 23:53:17: %FTD-6-737010: IPAA: Session=0x0000c000, AAA assigned address 10.0.50.101, succeeded

Sep 22 2021 23:53:17: %FTD-7-737001: IPAA: Session=0x0000c000, Received message 'IPv6 address request'

Sep 22 2021 23:53:17: %FTD-5-737034: IPAA: Session=0x0000c000, IPv6 address: no IPv6 address available from local pools

Sep 22 2021 23:53:17: %FTD-5-737034: IPAA: Session=0x0000c000, IPv6 address: callback failed during IPv6 request

Sep 22 2021 23:53:17: %FTD-4-722041: TunnelGroup <RA_VPN> GroupPolicy <DfltGrpPolicy> User <user1> IP <192.168.0.101> No IPv6 address available for SVC connection

Sep 22 2021 23:53:17: %FTD-7-609001: Built local-host Outside_Int:10.0.50.101

Sep 22 2021 23:53:17: %FTD-5-722033: Group <DfltGrpPolicy> User <user1> IP <192.168.0.101> First TCP SVC connection established for SVC session.

Sep 22 2021 23:53:17: %FTD-6-722022: Group <DfltGrpPolicy> User <user1> IP <192.168.0.101> TCP SVC connection established without compression

Sep 22 2021 23:53:17: %FTD-7-746012: user-identity: Add IP-User mapping 10.0.50.101 - LOCAL\user1 Succeeded - VPN user

Sep 22 2021 23:53:17: %FTD-6-722055: Group <DfltGrpPolicy> User <user1> IP <192.168.0.101> Client Type: Cisco AnyConnect VPN Agent for Windows 4.10.02086

Sep 22 2021 23:53:17: %FTD-4-722051: Group

User

IP <192.168.0.101> IPv4 Address <10.0.50.101> IPv6 address <::> assigned to session

ISEのRADIUS Liveログには次のように表示されます。

ステップ2:FTDヘッドエンド（ここではWindowsマシンを使用）に接続し、user2のクレデンシャルを入力します。

[Address Information] セクションでは、割り当てられたIPアドレスが、FMCを介して設定されたIPv4ローカルプールで使用可能な最初のIPアドレスであることが示されています。

FTDでのdebug radius allコマンドの出力は次のとおりです。

firepower# SVC message: t/s=5/16: The user has requested to disconnect the connection.

webvpn_svc_np_tear_down: no ACL

webvpn_svc_np_tear_down: no IPv6 ACL

np_svc_destroy_session(0xA000)

radius mkreq: 0x15

alloc_rip 0x0000145d043b6460

new request 0x15 --> 4 (0x0000145d043b6460)

got user 'user2'

got password

add_req 0x0000145d043b6460 session 0x15 id 4

RADIUS_REQUEST

radius.c: rad_mkpkt

rad_mkpkt: ip:source-ip=192.168.0.101

RADIUS packet decode (authentication request)

RADIUS packet decode (response)

--------------------------------------

Raw packet data (length = 130).....

02 04 00 82 a6 67 35 9e 10 36 93 18 1f 1b 85 37 | .....g5..6.....7

b6 c3 18 4f 01 07 75 73 65 72 32 19 3d 43 41 43 | ...O..user2.=CAC

53 3a 63 30 61 38 30 30 36 34 30 30 30 30 62 30 | S:c0a800640000b0

30 30 36 31 34 62 63 30 61 33 3a 64 72 69 76 65 | 00614bc0a3:drive

72 61 70 2d 49 53 45 2d 32 2d 37 2f 34 31 37 34 | rap-ISE-2-7/4174

39 34 39 37 38 2f 32 32 1a 2a 00 00 00 09 01 24 | 94978/22.*.....$

70 72 6f 66 69 6c 65 2d 6e 61 6d 65 3d 57 69 6e | profile-name=Win

64 6f 77 73 31 30 2d 57 6f 72 6b 73 74 61 74 69 | dows10-Workstati

6f 6e | on

Parsed packet data.....

Radius: Code = 2 (0x02)

Radius: Identifier = 4 (0x04)

Radius: Length = 130 (0x0082)

Radius: Vector: A667359E103693181F1B8537B6C3184F

Radius: Type = 1 (0x01) User-Name

Radius: Length = 7 (0x07)

Radius: Value (String) =

75 73 65 72 32 | user2

Radius: Type = 25 (0x19) Class

Radius: Length = 61 (0x3D)

Radius: Value (String) =

43 41 43 53 3a 63 30 61 38 30 30 36 34 30 30 30 | CACS:c0a80064000

30 62 30 30 30 36 31 34 62 63 30 61 33 3a 64 72 | 0b000614bc0a3:dr

69 76 65 72 61 70 2d 49 53 45 2d 32 2d 37 2f 34 | iverap-ISE-2-7/4

31 37 34 39 34 39 37 38 2f 32 32 | 17494978/22

Radius: Type = 26 (0x1A) Vendor-Specific

Radius: Length = 42 (0x2A)

Radius: Vendor ID = 9 (0x00000009)

Radius: Type = 1 (0x01) Cisco-AV-pair

Radius: Length = 36 (0x24)

Radius: Value (String) =

70 72 6f 66 69 6c 65 2d 6e 61 6d 65 3d 57 69 6e | profile-name=Win

64 6f 77 73 31 30 2d 57 6f 72 6b 73 74 61 74 69 | dows10-Workstati

6f 6e | on

rad_procpkt: ACCEPT

Got AV-Pair with value profile-name=Windows10-Workstation

RADIUS_ACCESS_ACCEPT: normal termination

RADIUS_DELETE

remove_req 0x0000145d043b6460 session 0x15 id 4

free_rip 0x0000145d043b6460

radius: send queue empty

FTD のログは次のとおりです。

<omitted output>

Sep 22 2021 23:59:26: %FTD-6-725002: Device completed SSL handshake with client Outside_Int:192.168.0.101/60459 to 192.168.0.100/443 for TLSv1.2 session

Sep 22 2021 23:59:35: %FTD-7-609001: Built local-host Outside_Int:172.16.0.8

Sep 22 2021 23:59:35: %FTD-6-113004: AAA user authentication Successful : server = 172.16.0.8 : user = user2

Sep 22 2021 23:59:35: %FTD-6-113009: AAA retrieved default group policy (DfltGrpPolicy) for user = user2

Sep 22 2021 23:59:35: %FTD-6-113008: AAA transaction status ACCEPT : user = user2

Sep 22 2021 23:59:35: %FTD-7-734003: DAP: User user2, Addr 192.168.0.101: Session Attribute aaa.radius["1"]["1"] = user2

Sep 22 2021 23:59:35: %FTD-7-734003: DAP: User user2, Addr 192.168.0.101: Session Attribute aaa.radius["25"]["1"] = CACS:c0a800640000d000614bc367:driverap-ISE-2-7/417494978/24

Sep 22 2021 23:59:35: %FTD-7-734003: DAP: User user2, Addr 192.168.0.101: Session Attribute aaa.cisco.grouppolicy = DfltGrpPolicy

Sep 22 2021 23:59:35: %FTD-7-734003: DAP: User user2, Addr 192.168.0.101: Session Attribute aaa.cisco.username = user2

Sep 22 2021 23:59:35: %FTD-7-734003: DAP: User user2, Addr 192.168.0.101: Session Attribute aaa.cisco.username1 = user2

Sep 22 2021 23:59:35: %FTD-7-734003: DAP: User user2, Addr 192.168.0.101: Session Attribute aaa.cisco.username2 =

Sep 22 2021 23:59:35: %FTD-7-734003: DAP: User user2, Addr 192.168.0.101: Session Attribute aaa.cisco.tunnelgroup = RA_VPN

Sep 22 2021 23:59:35: %FTD-6-734001: DAP: User user2, Addr 192.168.0.101, Connection AnyConnect: The following DAP records were selected for this connection: DfltAccessPolicy

Sep 22 2021 23:59:35: %FTD-6-113039: Group <DfltGrpPolicy> User <user2> IP <192.168.0.101> AnyConnect parent session started.

<omitted output>

Sep 22 2021 23:59:52: %FTD-6-725002: Device completed SSL handshake with client Outside_Int:192.168.0.101/60470 to 192.168.0.100/443 for TLSv1.2 session

Sep 22 2021 23:59:52: %FTD-7-737035: IPAA: Session=0x0000d000, 'IPv4 address request' message queued

Sep 22 2021 23:59:52: %FTD-7-737035: IPAA: Session=0x0000d000, 'IPv6 address request' message queued

Sep 22 2021 23:59:52: %FTD-7-737001: IPAA: Session=0x0000d000, Received message 'IPv4 address request'

Sep 22 2021 23:59:52: %FTD-5-737003: IPAA: Session=0x0000d000, DHCP configured, no viable servers found for tunnel-group 'RA_VPN'

Sep 22 2021 23:59:52: %FTD-7-737400: POOLIP: Pool=AC_Pool, Allocated 10.0.50.1 from pool

Sep 22 2021 23:59:52: %FTD-7-737200: VPNFIP: Pool=AC_Pool, Allocated 10.0.50.1 from pool

Sep 22 2021 23:59:52: %FTD-6-737026: IPAA: Session=0x0000d000, Client assigned 10.0.50.1 from local pool AC_Pool

Sep 22 2021 23:59:52: %FTD-6-737006: IPAA: Session=0x0000d000, Local pool request succeeded for tunnel-group 'RA_VPN'

Sep 22 2021 23:59:52: %FTD-7-737001: IPAA: Session=0x0000d000, Received message 'IPv6 address request'

Sep 22 2021 23:59:52: %FTD-5-737034: IPAA: Session=0x0000d000, IPv6 address: no IPv6 address available from local pools

Sep 22 2021 23:59:52: %FTD-5-737034: IPAA: Session=0x0000d000, IPv6 address: callback failed during IPv6 request

Sep 22 2021 23:59:52: %FTD-4-722041: TunnelGroup <RA_VPN> GroupPolicy <DfltGrpPolicy> User <user2> IP <192.168.0.101> No IPv6 address available for SVC connection

Sep 22 2021 23:59:52: %FTD-7-609001: Built local-host Outside_Int:10.0.50.1

Sep 22 2021 23:59:52: %FTD-5-722033: Group <DfltGrpPolicy> User <user2> IP <192.168.0.101> First TCP SVC connection established for SVC session.

Sep 22 2021 23:59:52: %FTD-6-722022: Group <DfltGrpPolicy> User <user2> IP <192.168.0.101> TCP SVC connection established without compression

Sep 22 2021 23:59:52: %FTD-7-746012: user-identity: Add IP-User mapping 10.0.50.1 - LOCAL\user2 Succeeded - VPN user

Sep 22 2021 23:59:52: %FTD-6-722055: Group <DfltGrpPolicy> User <user2> IP <192.168.0.101> Client Type: Cisco AnyConnect VPN Agent for Windows 4.10.02086

Sep 22 2021 23:59:52: %FTD-4-722051: Group

User

IP <192.168.0.101> IPv4 Address <10.0.50.1> IPv6 address <::> assigned to session

ISEのRADIUS Liveログには次のように表示されます。

注：AnyConnectクライアント間で重複するIPアドレスの競合を避けるには、FTD ipローカルプールとISE認可ポリシーの両方でIPアドレス割り当てに異なるIPアドレス範囲を使用する必要があす。この設定例では、10.0.50.1から10.0.50.100までのIPv4ローカルプールを使用してFTDが設定され、ISEサーバは10.0.50.101の静的IPアドレスを割り当てます。

トラブルシュート

ここでは、設定のトラブルシューティングに使用できる情報を示します。

FTD：

- debug radius all

ISE:

- RADIUS ライブ ログ