Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Conventions

Configuration

Diagramme du réseau

Configurations

Vérification

Dépannage

Dépannage des commandes

Informations connexes

Introduction

Cette configuration permet aux réseaux privés derrière trois boîtes de pare-feu Cisco Secure PIX Firewall d'être connectés par des tunnels VPN sur Internet ou tout réseau public qui utilise IPsec. Chacun des trois réseaux est connecté aux deux autres réseaux. Dans ce scénario, la traduction d'adresses de réseau (NAT) est requise pour les connexions à Internet public. Cependant, la NAT n'est pas requise pour le trafic entre les trois intranets, qui peut être transmis via un tunnel VPN sur l'Internet public.

Conditions préalables

Conditions requises

Pour que IPsec fonctionne, vous devez disposer d'une connectivité du point de terminaison du tunnel au point de terminaison du tunnel avant de commencer cette configuration.

Components Used

Cette configuration a été développée et testée avec PIX Firewall version 6.1(2).

Remarque : La commande show version doit indiquer que le chiffrement est activé.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Pour plus d'informations sur les conventions utilisées dans ce document, reportez-vous à Conventions relatives aux conseils techniques Cisco.

Configuration

Cette section vous fournit des informations pour configurer les fonctionnalités décrites dans ce document.

Remarque : utilisez l'outil de recherche de commandes (clients enregistrés uniquement) pour obtenir plus d'informations sur les commandes utilisées dans cette section.

Diagramme du réseau

Ce document utilise la configuration réseau suivante :

Configurations

Ce document utilise les configurations suivantes :

- PIX 1

- PIX 2

- PIX 3

Configuration PIX 1

PIX Version 6.1(2)

nameif ethernet0 outside security0

nameif ethernet1 inside security100

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname pix_1

fixup protocol ftp 21

fixup protocol http 80

fixup protocol h323 1720

fixup protocol rsh 514

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol sip 5060

names

!--- Traffic to PIX 2 private network:

access-list 120 permit ip 10.1.1.0 255.255.255.0 10.2.2.0 255.255.255.0

!--- Traffic to PIX 3 private network:

access-list 130 permit ip 10.1.1.0 255.255.255.0 10.3.3.0 255.255.255.0

!--- Do not perform NAT for traffic to !--- other PIX Firewall private networks:

access-list 100 permit ip 10.1.1.0 255.255.255.0 10.2.2.0 255.255.255.0

access-list 100 permit ip 10.1.1.0 255.255.255.0 10.3.3.0 255.255.255.0

pager lines 24

logging on

no logging timestamp

no logging standby

no logging console

no logging monitor

no logging buffered

no logging trap

no logging history

logging facility 20

logging queue 512

interface ethernet0 auto

interface ethernet1 auto

mtu outside 1500

mtu inside 1500

ip address outside 172.18.124.153 255.255.255.0

ip address inside 10.1.1.1 255.255.255.0

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

failover ip address outside 0.0.0.0

failover ip address inside 0.0.0.0

arp timeout 14400

!--- Do not perform NAT for traffic to other PIX Firewalls:

nat (inside) 0 access-list 100

route outside 0.0.0.0 0.0.0.0 172.18.124.1 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h323

0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

no snmp-server location

no snmp-server contact

snmp-server community public

snmp-server enable traps

floodguard enable

sysopt connection permit-ipsec

no sysopt route dnat

crypto ipsec transform-set myset esp-des esp-md5-hmac

!--- IPsec configuration for tunnel to PIX 2:

crypto map newmap 20 ipsec-isakmp

crypto map newmap 20 match address 120

crypto map newmap 20 set peer 172.18.124.154

crypto map newmap 20 set transform-set myset

!--- IPsec configuration for tunnel to PIX 3:

crypto map newmap 30 ipsec-isakmp

crypto map newmap 30 match address 130

crypto map newmap 30 set peer 172.18.124.157

crypto map newmap 30 set transform-set myset

crypto map newmap interface outside

isakmp enable outside

isakmp key ******** address 172.18.124.154 netmask 255.255.255.255

no-xauth no-config-mode

isakmp key ******** address 172.18.124.157 netmask 255.255.255.255

no-xauth no-config-mode

isakmp identity address

isakmp policy 10 authentication pre-share

isakmp policy 10 encryption des

isakmp policy 10 hash md5

isakmp policy 10 group 1

isakmp policy 10 lifetime 1000

telnet timeout 5

ssh timeout 5

terminal width 80

Cryptochecksum:436c96500052d0276324b9ef33221b2d

: end

[OK]

Configuration PIX 2

PIX Version 6.1(2)

nameif ethernet0 outside security0

nameif ethernet1 inside security100

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname pix_2

fixup protocol ftp 21

fixup protocol http 80

fixup protocol h323 1720

fixup protocol rsh 514

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol sip 5060

names

!--- Traffic to PIX 1:

access-list 110 permit ip 10.2.2.0 255.255.255.0 10.1.1.0 255.255.255.0

!--- Traffic to PIX 3:

access-list 130 permit ip 10.2.2.0 255.255.255.0 10.3.3.0 255.255.255.0

!--- Do not perform NAT for traffic to other PIX Firewalls:

access-list 100 permit ip 10.2.2.0 255.255.255.0 10.1.1.0 255.255.255.0

access-list 100 permit ip 10.2.2.0 255.255.255.0 10.3.3.0 255.255.255.0

pager lines 24

logging on

no logging timestamp

no logging standby

no logging console

no logging monitor

no logging buffered

no logging trap

no logging history

logging facility 20

logging queue 512

interface ethernet0 auto

interface ethernet1 auto

mtu outside 1500

mtu inside 1500

ip address outside 172.18.124.154 255.255.255.0

ip address inside 10.2.2.1 255.255.255.0

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

failover ip address outside 0.0.0.0

failover ip address inside 0.0.0.0

arp timeout 14400

!--- Do not perform NAT for traffic to other PIX Firewalls:

nat (inside) 0 access-list 100

route outside 0.0.0.0 0.0.0.0 172.18.124.1 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h323

0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

sysopt connection permit-ipsec

no sysopt route dnat

crypto ipsec transform-set myset esp-des esp-md5-hmac

!--- IPsec configuration for tunnel to PIX 1:

crypto map newmap 10 ipsec-isakmp

crypto map newmap 10 match address 110

crypto map newmap 10 set peer 172.18.124.153

crypto map newmap 10 set transform-set myset

!--- IPsec configuration for tunnel to PIX 3:

crypto map newmap 30 ipsec-isakmp

crypto map newmap 30 match address 130

crypto map newmap 30 set peer 172.18.124.157

crypto map newmap 30 set transform-set myset

crypto map newmap interface outside

isakmp enable outside

isakmp key ******** address 172.18.124.153 netmask 255.255.255.255

no-xauth no-config-mode

isakmp key ******** address 172.18.124.157 netmask 255.255.255.255

no-xauth no-config-mode

isakmp identity address

isakmp policy 10 authentication pre-share

isakmp policy 10 encryption des

isakmp policy 10 hash md5

isakmp policy 10 group 1

isakmp policy 10 lifetime 1000

telnet timeout 5

ssh timeout 5

terminal width 80

Cryptochecksum:aef12453a0ea29b592dd0d395de881f5

: end

Configuration PIX 3

PIX Version 6.1(2)

nameif ethernet0 outside security0

nameif ethernet1 inside security100

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname pix_3

fixup protocol ftp 21

fixup protocol http 80

fixup protocol h323 1720

fixup protocol rsh 514

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol sip 5060

names

!--- IPsec configuration for tunnel to PIX 1:

access-list 110 permit ip 10.3.3.0 255.255.255.0 10.1.1.0 255.255.255.0

!--- IPsec configuration for tunnel to PIX 2:

access-list 120 permit ip 10.3.3.0 255.255.255.0 10.2.2.0 255.255.255.0

!--- Do not perform NAT for traffic to other PIX Firewalls:

access-list 100 permit ip 10.3.3.0 255.255.255.0 10.2.2.0 255.255.255.0

access-list 100 permit ip 10.3.3.0 255.255.255.0 10.1.1.0 255.255.255.0

pager lines 24

logging on

no logging timestamp

no logging standby

no logging console

no logging monitor

no logging buffered

no logging trap

no logging history

logging facility 20

logging queue 512

interface ethernet0 auto

interface ethernet1 auto

mtu outside 1500

mtu inside 1500

ip address outside 172.18.124.157 255.255.255.0

ip address inside 10.3.3.1 255.255.255.0

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

failover ip address outside 0.0.0.0

failover ip address inside 0.0.0.0

arp timeout 14400

!--- Do not perform NAT for traffic to other PIX Firewalls:

nat (inside) 0 access-list 100

route outside 0.0.0.0 0.0.0.0 172.18.124.1 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h323

0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

sysopt connection permit-ipsec

no sysopt route dnat

crypto ipsec transform-set myset esp-des esp-md5-hmac

!--- IPsec configuration for tunnel to PIX 1:

crypto map newmap 10 ipsec-isakmp

crypto map newmap 10 match address 110

crypto map newmap 10 set peer 172.18.124.153

crypto map newmap 10 set transform-set myset

!--- IPsec configuration for tunnel to PIX 2:

crypto map newmap 20 ipsec-isakmp

crypto map newmap 20 match address 120

crypto map newmap 20 set peer 172.18.124.154

crypto map newmap 20 set transform-set myset

crypto map newmap interface outside

isakmp enable outside

isakmp key ******** address 172.18.124.153 netmask 255.255.255.255

no-xauth no-config-mode

isakmp key ******** address 172.18.124.154 netmask 255.255.255.255

no-xauth no-config-mode

isakmp identity address

isakmp policy 10 authentication pre-share

isakmp policy 10 encryption des

isakmp policy 10 hash md5

isakmp policy 10 group 1

isakmp policy 10 lifetime 1000

telnet timeout 5

ssh timeout 5

terminal width 80

Cryptochecksum:e6ad75852dff21efdb2d24cc95ffbe1c

: end

[OK]

Vérification

Aucune procédure de vérification n'est disponible pour cette configuration.

Dépannage

Cette section fournit des informations que vous pouvez utiliser pour dépanner votre configuration. Référez-vous à Dépannage du PIX pour passer le trafic de données sur un tunnel IPsec établi pour plus d'informations.

Dépannage des commandes

Remarque : Consulter les renseignements importants sur les commandes de débogage avant d’utiliser les commandes de débogage.

Commandes de débogage

Utilisez ces commandes sur le PIX, avec les commandes logging monitor debugging ou logging console debugging en cours d'exécution.

- debug crypto ipsec - Débogue le traitement IPsec.

- debug crypto isakmp - Débogue le traitement ISAKMP (Internet Security Association and Key Management Protocol).

- debug crypto engine - Affiche les messages de débogage sur les moteurs de chiffrement, qui effectuent le chiffrement et le déchiffrement.

Commandes clear

Afin de supprimer les associations de sécurité (SA), utilisez ces commandes en mode de configuration du PIX.

- clear [crypto] ipsec sa - Supprime les SA IPSec actives. Le mot clé crypto est facultatif.

- clear [crypto] isakmp sa : supprime les SA IKE (Internet Key Exchange) actives. Le mot clé crypto est facultatif.

Remarque : pour qu'IPsec fonctionne, vous devez disposer d'une connectivité du point de terminaison du tunnel au point de terminaison du tunnel avant de commencer cette configuration.

Informations connexes

- Dépannage de PIX de sorte qu'il permette le passage du trafic de données sur un tunnel IPSec établi

- Dispositifs de sécurité de la gamme Cisco PIX 500

- Références des commandes du pare-feu PIX

- Négociations IPsec/Protocoles IKE

- Demandes de commentaires (RFC)

- Support et documentation techniques - Cisco Systems