Contenido

Introducción

Antes de comenzar

Convenciones

Prerequisites

Componentes Utilizados

Teoría Precedente

Configurar

Diagrama de la red

Configuraciones

Verificación

Ejemplo de Resultado del Comando show

Troubleshoot

Información Relacionada

Introducción

Este documento brinda configuraciones de ejemplo en la conexión troncal 802.1Q (punto1q) entre switches Catalyst 5500 y 5000 que ejecutan el OS de Catalyst (CatOS). Cualquier miembro de la familia Catalyst 4000, 5000 o 6000 que ejecute CatOS se puede utilizar en este escenario para obtener los mismos resultados.

Los troncos transportan el tráfico de VLAN múltiples por un único link y le permiten extender las VLAN en toda una red. Estas son dos formas en las que se puede implementar Ethernet trunking:

- Protocolo InterSwitch Link (ISL): ISL es una encapsulación troncal propiedad de Cisco. Para obtener más información sobre ISL, consulte Formato de Trama de Link InterSwitch.

- 802.1Q (estándar IEEE) - 802.1Q es una encapsulación de troncal estándar del sector. Para obtener más información sobre 802.1Q, refiérase a Trunking entre Catalyst 4000, 5000 y 6000 Family Switches Usando Encapsulación 802.1Q.

Antes de comenzar

Convenciones

Para obtener más información sobre las convenciones del documento, consulte Convenciones de Consejos Técnicos de Cisco.

Prerequisites

Este documento muestra los archivos de configuración de los switches CatOS y el resultado de los comandos show de ejemplo relacionados. Para más detalles sobre cómo configurar un troncal 802.1Q entre switches Catalyst, consulte el siguiente documento:

- Trunking entre Switches de la Familia Catalyst 4000, 5000 y 6000 mediante Encapsulación 802.1q

Componentes Utilizados

Para crear los ejemplos usados en este documento, se utilizaron los siguientes switches en un ambiente de laboratorio con configuraciones despejadas:

- Switch Catalyst 5500 que ejecuta el software Catalyst OS 6.4(2)

- Switch Catalyst 6500 que ejecuta el software Catalyst OS 6.4(2)

Las configuraciones en todos los dispositivos se borraron con el comando clear config all para asegurarse de que tuvieran una configuración predeterminada.

La información que se presenta en este documento se originó a partir de dispositivos dentro de un ambiente de laboratorio específico. All of the devices used in this document started with a cleared (default) configuration. Si la red está funcionando, asegúrese de haber comprendido el impacto que puede tener un comando antes de ejecutarlo.

Teoría Precedente

Tenga en cuenta lo siguiente:

- Los switches de la familia Catalyst 4000 (incluidos Catalyst 2948G y Catalyst 2980G) solo admiten enlaces troncales 802.1Q, no enlaces ISL. Para obtener más información, consulte Requisitos del sistema para implementar el enlace troncal.

- Todos los puertos Ethernet en el Catalyst 6000/6500 admiten encapsulación 802.1Q e ISL, con la excepción del módulo de conmutación 10-Gigabit Ethernet, que no admite ISL.

- Según el módulo, los puertos con capacidad de conexión troncal del Catalyst 5000 sólo admiten encapsulación ISL o bien ISL y 802.1Q. La mejor manera de verificar esto es ejecutar el comando show port capabilities. La capacidad de conexión de troncal se establece en forma explícita. Por ejemplo:

cat5509> show port capabilities 2/1

Model                    WS-X5550

Port                     2/1

Type                     1000BaseSX

Speed                    1000

Duplex                   full

Trunk encap type         802.1Q,ISL

!-- This particular port supports both 802.1Q and ISL.

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  no

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on,desired),send-(off,on,desired)

Security                 no

Dot1x                    yes

Membership               static

Fast start               yes

QOS scheduling           rx-(none),tx-(none)

CoS rewrite              no

ToS rewrite              no

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            no

SPAN                     source,destination

cat5509> (enable)

Para obtener más información sobre los requisitos del sistema para el enlace troncal, consulte Requisitos del sistema para implementar el enlace troncal.

- Asegúrese de que los modos troncales coincidan con el link troncal. Si uno de los lados del link está configurado como troncal ISL, el otro lado del link también debe ser configurado como ISL. De manera similar, si un extremo del link está configurado como un 802.1Q, el otro lado del link también debería estar configurado como 802.1Q.

- En la conexión troncal 802.1Q, todos los paquetes VLAN tienen etiquetas en el link troncal, salvo en la VLAN nativa. Los paquetes VLAN nativos se envían sin etiquetas en el link de troncal. Por lo tanto, la VLAN nativa debe ser la misma en ambos switches configurados para el trunking. De este modo, podemos deducir a qué VLAN pertenece una trama cuando recibimos una trama sin indicador. Por defecto, VLAN1 es la VLAN nativa de todos los switches.

- En CatOS, la VLAN puede modificarse mediante el comando set vlan vlan-id mod/port, donde mod/port es el puerto troncal.

Para obtener más información, consulte Trunking entre Catalyst 4000, 5000 y 6000 Family Switches con Encapsulación 802.1Q.

Configurar

En esta sección encontrará la información para configurar las funciones descritas en este documento.

Nota: Para encontrar información adicional sobre los comandos usados en este documento, utilice la Command Lookup Tool (sólo clientes registrados) .

Diagrama de la red

Este documento utiliza la instalación de red que se muestra en el siguiente diagrama.

Configuraciones

Este documento usa las configuraciones detalladas a continuación.

Nota: Los comentarios entre los resultados se agregan en cursiva azul.

- Catalyst 5509

- Catalyst 6500

Catalyst 5509

#version 6.4(2)

!

set option fddi-user-pri enabled

set password $2$q.J7$O5n.pwx7aEC6NHWJfXadx1

set enablepass $2$o.h/$bAxfjJ4XUA/RMUHqBr1YQ0

!

#errordetection

set errordetection portcounter enable

!

#system

set system name  cat5509

!

#frame distribution method

set port channel all distribution mac both

!

#vtp

!--- In this example, the VTP mode is set to be transparent. !--- Depending on your network, set the VLAN Trunking Protocol (VTP) !--- mode accordingly.

set vtp mode transparent

!--- For details on VTP, refer to Configuring VTP on Catalyst Switches.

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp ibm

set vlan 2

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state acti

ve mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

#ip

!--- IP address used for management.

set interface sc0 1 10.10.10.2/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash slot0:cat5000-supg.6-4-2.bin

!

# default port status is enable

!

!

#module 1 empty

!

#module 2 : 2-port 1000BaseX Supervisor IIIG

!--- The dot1q trunking mode is set to on. Depending on your network !--- and requirements, set the trunking mode accordingly.

set trunk 2/1  on dot1q 1-1005

!--- For details on different trunking modes, refer to !--- Configuring VLAN Trunks on Fast Ethernet and Gigabit Ethernet Ports.

!

#module 3 empty

!

#module 4 empty

#module 5 : 24-port 10/100BaseTX Ethernet

!--- Ports 5/3-24 have been assigned to VLAN 2.

set vlan 2    5/3-24

!--- Portfast has been enabled on the ports connected to the workstations.

set spantree portfast 5/2-24 enable

!--- For details on why to enable portfast,refer to !--- Using PortFast and Other Commands to Fix Workstation Startup Connectivity Delays.

!

#module 6 empty

!

!--- Output suppressed.

end

Catalyst 6500

#Version 6.4(2)

!

set option fddi-user-pri enabled

set password $2$J75L$Ug4163kfeHTDcLJZ/L9es1

set enablepass $2$h/BN$i3S54iNvIXknFelh6gOve0

!

#errordetection

set errordetection portcounter enable

!

#system

set system name  cat6500

!

#frame distribution method

set port channel all distribution Mac both

!

#vtp

!--- In this example, the VTP mode is set to be transparent. !--- Depending on your network, set the VTP mode accordingly.

set vtp mode transparent

!--- For details on VTP, refer to !--- Configuring VTP on Catalyst Switches.

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

!--- The lines below are wrapped around for display reasons.

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state   active stp IEEE

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state

active stp IBM

set vlan 2

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state

active mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

#ip

!--- IP address used for management.

set interface sc0 1 10.10.10.3/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash slot0:cat6000-sup2.6-4-2.bin

!

# default port status is enable

!

!

#module 1 : 2-port 1000BaseX Supervisorset module name    1

!

#module 2 : 12-port 10/100BaseTX Ethernet

!

#module 3 : 8-port 1000BaseX Ethernet

set module name    3

!--- The dot1q trunking mode is set to on. Depending on your network !--- and requirements, set the trunking mode accordingly.

set trunk 3/1  on dot1q 1-1005,1025-4094

!--- For details on different trunking modes, refer to !--- Configuring VLAN Trunks on Fast Ethernet and Gigabit Ethernet Ports.

!

#module 4 : 48-port 10/100BaseTX Ethernet

!--- Ports 4/3-24 have been assigned to VLAN 2.

set vlan 2    4/3-48

!--- Portfast has been enabled on the ports connected to the workstations.

set spantree portfast 4/2-48 enable

!--- For details on why to enable portfast, refer to !--- Using PortFast and Other Commands to Fix Workstation Startup Connectivity Delays.

!

#module 5 : 12-port 10BaseFL Ethernet

end

!--- Output suppressed.

Verificación

En esta sección encontrará información que puede utilizar para confirmar que su configuración esté funcionando correctamente.

La herramienta Output Interpreter (sólo para clientes registrados) permite utilizar algunos comandos “show” y ver un análisis del resultado de estos comandos.

- show port capabilities module/port

- show port module/port

- show trunk

- show vtp domain

Ejemplo de Resultado del Comando show

Switch Catalyst 5509

A continuación se muestran algunos de los comandos utilizados para verificar las configuraciones de enlace troncal:

show port capabilities module/port: este comando se utiliza para verificar si el puerto puede realizar la concentración de enlaces.

cat5509> (enable)  show port capabilities 2/1

Model                    WS-X5550

Port                     2/1

Type                     1000BaseSX

Speed                    1000

Duplex                   full

Trunk encap type         802.1Q,ISL

!--- This particular port supports both 802.1Q and ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  no

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on,desired),send-(off,on,desired)

Security                 no

Dot1x                    yes

Membership               static

Fast start               yes

QOS scheduling           rx-(none),TX(1q4t)

COs rewrite              no

ToS rewrite              no

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            no

SPAN                     source,destination

cat5509> (enable)

show port module/port – Este comando informa sobre el estado de un puerto determinado, y si está realizando conexiones troncales o no.

cat5509> (enable) show port 2/1

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

2/1                     connected  trunk      normal   full  1000 1000BaseSX

Port   Trap      IfIndex

-----  --------  -------

2/1   disabled  47

Port     Broadcast-Limit Broadcast-Drop

-------- --------------- --------------

2/1                   -              0

Port  Send FlowControl  Receive FlowControl   RxPause    TxPause    Unsupported

admin    oper     admin     oper                              opcodes

----- -------- -------- --------- ---------   ---------- ---------- -----------

2/1  desired  off      off       off         0          0          0

Port  Align-Err  FCS-Err    Xmit-Err   Rcv-Err    UnderSize

----- ---------- ---------- ---------- ---------- ---------

2/1           0          0          0          2         0

Port  Single-Col Multi-Coll Late-Coll  Excess-Col Carri-Sen Runts     Giants

----- ---------- ---------- ---------- ---------- --------- --------- ---------

2/1           0          0          0          0         0         0         -

!--- Output suppressed.

show trunk – Este comando se utiliza para verificar el estado y la configuración de enlaces troncales.

cat5500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

4/1      on           dot1q          trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

4/1      1-1005

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

4/1      1-2

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

4/1      1-2

show vtp domain – Este comando se utiliza para verificar la información de VTP.

cat5500> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

1            2           Transparent -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

6          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

10.10.10.2      disabled disabled 2-1000

Si tiene el resultado de un comando show-tech support de su dispositivo Cisco, puede utilizar Output Interpreter (sólo para clientes registrados) para mostrar posibles problemas y soluciones.

Catalyst 6500 Switch

A continuación se muestran algunos de los comandos utilizados para verificar las configuraciones de trunking:

show port capabilities module/port: este comando se utiliza para verificar si el puerto puede realizar la concentración de enlaces.

cat6500> (enable) show port capabilities 3/1

Model                    WS-X6408A-GBIC

Port                     3/1

Type                     1000BaseSX

Speed                    1000

Duplex                   full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Dot1x                    yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1p1q4t),tx-(1p2q2t)

CoS rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             no

AuxiliaryVlan            no

SPAN                     source,destination

COPS port group          3/1-4

Link debounce timer      yes

show port module/port – Este comando informa sobre el estado de un puerto determinado, y si está realizando conexiones troncales o no.

cat6500> (enable) show port 3/1

Port  Name                 Status     Vlan       Duplex Speed Type

----- -------------------- ---------- ---------- ------ ----- ------------

3/1                       connected  trunk        full  1000 1000BaseSX

Port  Security Violation Shutdown-Time Age-Time Max-Addr  Trap    IfIndex

----- -------- --------- ------------- -------- -------- -------- -------

3/1   disabled shutdown     0             0       1      disabled   61

!--- Output suppressed.

show trunk – Este comando se utiliza para verificar el estado y la configuración de enlaces troncales.

cat6500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/1      on           dot1q          trunking      1

Port Vlans allowed on trunk

-------- ---------------------------------------------------------------------

3/1 1-1005,1025-4094

Port Vlans allowed and active in management domain

-------- ---------------------------------------------------------------------

3/1 1-2

Port Vlans in spanning tree forwarding state and not pruned

-------- ---------------------------------------------------------------------

3/1 1-2

show vtp domain – Este comando se utiliza para verificar la información de VTP.

cat5000> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

1            2           Transparent -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

6          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

10.10.10.3      disabled disabled 2-1000

Troubleshoot

Actualmente, no hay información específica de troubleshooting disponible para esta configuración.

Información Relacionada

- Trunking entre Switches de la Familia Catalyst 4000, 5000 y 6000 mediante Encapsulación 802.1q

- Configuración de troncales VLAN en Fast Ethernet y puertos Ethernet Gigabit

- Configuración de VTP con switch Catalyst

- Uso de Portfast y otros comandos para solucionar retrasos al iniciar la conectividad de la estación de trabajo

- Soporte de Tecnología de LAN Switching

- Soporte de Producto para Switches de ATM y Catalyst de LAN

- Soporte Técnico - Cisco Systems