المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

الاصطلاحات

التكوين

الرسم التخطيطي للشبكة

التكوينات

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

أوامر استكشاف الأخطاء وإصلاحها

إخراج تصحيح الأخطاء للعينة

تشكيل خاطئ من نفق أسلوب

معلومات ذات صلة

المقدمة

يصف هذا المستند كيفية تكوين تضمين التوجيه العام (GRE) عبر IPSec بين مركز Cisco VPN 5000 Series وموجه Cisco الذي يشغل برنامج Cisco IOS®. يتم إدخال ميزة GRE-over-IPSec في إصدار البرنامج VPN 5000 Concentrator 6.0(19).

في هذا مثال، استعملت تحشد ساكن إستاتيكي أن يوجه ربط عبر النفق.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

- برنامج IOS الإصدار 12.2(3) من Cisco

- برنامج مركز Cisco VPN 5000، الإصدار 6.0(19)

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

الاصطلاحات

للحصول على مزيد من المعلومات حول اصطلاحات المستندات، ارجع إلى اصطلاحات تلميحات Cisco التقنية.

التكوين

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

ملاحظة: للعثور على معلومات إضافية حول الأوامر المستخدمة في هذا المستند، أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط).

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة الموضح في هذا الرسم التخطيطي.

يتم تكوين GRE عبر IPSec بين الموجه 1720-1 الذي يشغل برنامج Cisco IOS Software ومركز VPN 5002. خلف الموجه ومجمع الشبكة الخاصة الظاهرية (VPN)، هناك شبكات متعددة يتم الإعلان عنها من خلال مسار مفتوح أقصر أولا (OSPF). يعمل بروتوكول OSPF داخل نفق GRE بين الموجه ومكثف الشبكة الخاصة الظاهرية (VPN).

- هذه الشبكات موجودة خلف الموجه 1720-1.

- 10.1.1.0/24

- 10.1.2.0/24

- 10.1.3.0/24

- هذه الشبكات موجودة خلف مركز VPN 5002.

- 20.1.1.0/24

- 20.1.2.0/24

- 20.1.3.0/24

التكوينات

يستخدم هذا المستند هذه التكوينات.

- الموجه 1720-1

- مركز VPN 5002

ملاحظة: باستخدام الإصدار 12.2(13)T من برنامج Cisco IOS Software والإصدارات الأحدث (رموز t-train الأعلى عددا، الإصدار 12.3 والرموز الأحدث)، يجب تطبيق خريطة تشفير IPSec التي تم تكوينها على الواجهة المادية فقط. لم تعد بحاجة إلى تطبيق خريطة التشفير على واجهة نفق GRE. يجب أن يعمل وجود خريطة التشفير على الواجهات المادية والنفقية عند إستخدام الإصدار 12.2.2(13)T من البرنامج Cisco IOS Software والإصدارات الأحدث، ولكن توصي Cisco Systems بتطبيق خريطة التشفير على الواجهة المادية فقط.

الموجه 1720-1

Current configuration : 1305 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 1720-1

!

no logging buffered

no logging monitor

enable secret 5 $1$vIzI$RqD0LqlqbSFCCjVELFLfH/

!

memory-size iomem 15

ip subnet-zero

no ip domain-lookup

!

ip audit notify log

ip audit po max-events 100

ip ssh time-out 120

ip ssh authentication-retries 3

!

crypto isakmp policy 1

hash md5

authentication pre-share

crypto isakmp key cisco123 address 172.16.172.21

!

!

crypto ipsec transform-set myset esp-des esp-md5-hmac

mode transport

!

crypto map vpn 10 ipsec-isakmp

set peer 172.16.172.21

set transform-set myset

match address 102

!

cns event-service server

!

!

!

interface Tunnel0

ip address 50.1.1.1 255.255.255.252

tunnel source FastEthernet0

tunnel destination 172.16.172.21

crypto map vpn

!

interface FastEthernet0

ip address 172.16.172.39 255.255.255.240

speed auto

crypto map vpn

!

interface Serial0

ip address 10.1.1.2 255.255.255.0

encapsulation ppp

!

ip classless

ip route 0.0.0.0 0.0.0.0 172.16.172.33

ip route 10.1.0.0 255.255.0.0 10.1.1.1

ip route 20.1.0.0 255.255.0.0 Tunnel0

no ip http server

!

access-list 102 permit gre host 172.16.172.39 host 172.16.172.21

!

line con 0

line aux 0

line vty 0 4

password cisco

login

!

no scheduler allocate

end

مركز VPN 5002

[ General ]

VPNGateway               = 172.16.172.17

EthernetAddress          = 00:05:32:3e:90:40

DeviceType               = VPN 5002/8 Concentrator

ConfiguredOn             = Timeserver not configured

ConfiguredFrom           = Command Line, from Console

[ IKE Policy ]

Protection               = SHA_DES_G1

Protection               = MD5_DES_G2

Protection               = MD5_DES_G1

[ Tunnel Partner VPN 1 ]

KeyLifeSecs              = 3500

KeepaliveInterval        = 120

TunnelType               = GREinIPSec

InactivityTimeout        = 120

Transform                = ESP(MD5,DES)

BindTo                   = "Ethernet 1:0"

SharedKey                = "cisco123"

Certificates             = Off

Mode                     = Main

KeyManage                = Reliable

Partner                  = 172.16.172.39

[ IP VPN 1 ]

HelloInterval            = 10

SubnetMask               = 255.255.255.252

IPAddress                = 50.1.1.2

DirectedBroadcast        = Off

Numbered                 = On

Mode                     = Routed

[ IP Ethernet 1:0 ]

Mode                     = Routed

SubnetMask               = 255.255.255.240

IPBroadcast              = 172.16.172.32

IPAddress                = 172.16.172.21

[ IP Ethernet 0:0 ]

Mode                     = Routed

IPBroadcast              = 20.1.1.255

SubnetMask               = 255.255.255.0

IPAddress                = 20.1.1.1

[ Logging ]

Level                    = Debug

LogToAuxPort             = On

Enabled                  = On

[ Ethernet Interface Ethernet 0:0 ]

DUPLEX                   = half

SPEED                    = 10meg

[ IP Static ]

0.0.0.0 0.0.0.0 20.1.1.5 1

10.1.1.0 255.255.255.0 VPN 1 1

10.1.2.0 255.255.255.0 VPN 1 1

10.1.3.0 255.255.255.0 VPN 1 1

Configuration size is 1696 out of 65500 bytes.

التحقق من الصحة

يوفر هذا القسم معلومات يمكنك إستخدامها للتأكد من أن التكوين يعمل بشكل صحيح.

يتم دعم بعض أوامر العرض بواسطة أداة مترجم الإخراج (العملاء المسجلون فقط)، والتي تتيح لك عرض تحليل إخراج أمر العرض.

- يمكن تشغيل هذه الأوامر على موجه Cisco IOS.

- show crypto isakmp sa— يعرض جميع اقترانات أمان بروتوكول إدارة المفاتيح وارتباط أمان الإنترنت (ISAKMP) الحالية.

- show crypto ipSec sa— يعرض جميع رسائل IPSec الحالية.

- show crypto engine connection active—يعرض عداد تشفير/فك تشفير الحزم لكل IPSec SAs.

- أنت يستطيع ركضت هذا أمر على ال VPN 5002 مركز.

- show system log buffer— يعرض معلومات syslog الأساسية.

- تفريغ تتبع VPN — يعرض معلومات تفصيلية حول عمليات VPN.

استكشاف الأخطاء وإصلاحها

يوفر هذا القسم معلومات يمكنك استخدامها لاستكشاف أخطاء التكوين وإصلاحها.

أوامر استكشاف الأخطاء وإصلاحها

ملاحظة: قبل إصدار أوامر تصحيح الأخطاء، يرجى الاطلاع على المعلومات المهمة في أوامر تصحيح الأخطاء.

يمكنك تشغيل هذه الأوامر على موجه Cisco IOS.

- debug crypto isakmp—يعرض معلومات تفصيلية حول تفاوض مفتاح الإنترنت (IKE) المرحلة الأولى (الوضع الرئيسي).

- debug crypto ipSec—يعرض معلومات تفصيلية حول تفاوض المرحلة الثانية (الوضع السريع) من IKE.

- debug crypto engine—تصحيح أخطاء تشفير/فك تشفير الحزم وعملية Diffie-Hellman (DH).

إخراج تصحيح الأخطاء للعينة

يتم عرض إخراج تصحيح الأخطاء للعينة للموجه ومركز الشبكة الخاصة الظاهرية (VPN) هنا.

- موجه IOS من Cisco

- مركز VPN 5002

تصحيح الأخطاء على موجه Cisco IOS

يتم عرض إخراج أوامر debug crypto isakmp وdebug crypto ipSec على الموجه هنا.

5d20h: ISAKMP (0:0): received packet from 172.16.172.21 (N) NEW SA

5d20h: ISAKMP: local port 500, remote port 500

5d20h: ISAKMP (0:81): processing SA payload. message ID = 0

5d20h: ISAKMP (0:81): found peer pre-shared key matching 172.16.172.21

5d20h: ISAKMP (0:81): Checking ISAKMP transform 1 against priority 1 policy

5d20h: ISAKMP:      encryption DES-CBC

5d20h: ISAKMP:      hash SHA

5d20h: ISAKMP:      auth pre-share

5d20h: ISAKMP:      default group 1

5d20h: ISAKMP (0:81): atts are not acceptable. Next payload is 3

5d20h: ISAKMP (0:81): Checking ISAKMP transform 2 against priority 1 policy

5d20h: ISAKMP:      encryption DES-CBC

5d20h: ISAKMP:      hash MD5

5d20h: ISAKMP:      auth pre-share

5d20h: ISAKMP:      default group 2

5d20h: ISAKMP (0:81): atts are not acceptable. Next payload is 3

5d20h: ISAKMP (0:81): Checking ISAKMP transform 3 against priority 1 policy

5d20h: ISAKMP:      encryption DES-CBC

5d20h: ISAKMP:      hash MD5

5d20h: ISAKMP:      auth pre-share

5d20h: ISAKMP:      default group 1

5d20h: ISAKMP (0:81): atts are acceptable. Next payload is 0

5d20h: ISAKMP (0:81): processing vendor id payload

5d20h: ISAKMP (0:81): SA is doing pre-shared key authentication

using id type ID_IPV4_ADDR

5d20h: ISAKMP (0:81): sending packet to 172.16.172.21 (R) MM_SA_SETUP

5d20h: ISAKMP (0:81): received packet from 172.16.172.21 (R) MM_SA_SETUP

5d20h: ISAKMP (0:81): processing KE payload. message ID = 0

5d20h: ISAKMP (0:81): processing NONCE payload. message ID = 0

5d20h: ISAKMP (0:81): found peer pre-shared key matching 172.16.172.21

5d20h: ISAKMP (0:81): SKEYID state generated

5d20h: ISAKMP (0:81): sending packet to 172.16.172.21 (R) MM_KEY_EXCH

5d20h: ISAKMP (0:81): received packet from 172.16.172.21 (R) MM_KEY_EXCH

5d20h: ISAKMP (0:81): processing ID payload. message ID = 0

5d20h: ISAKMP (0:81): processing HASH payload. message ID = 0

5d20h: ISAKMP (0:81): SA has been authenticated with 172.16.172.21

5d20h: ISAKMP (81): ID payload

next-payload : 8

type         : 1

protocol     : 17

port         : 500

length       : 8

5d20h: ISAKMP (81): Total payload length: 12

5d20h: ISAKMP (0:81): sending packet to 172.16.172.21 (R) QM_IDLE

5d20h: ISAKMP (0:81): received packet from 172.16.172.21 (R) QM_IDLE

5d20h: ISAKMP (0:81): processing HASH payload. message ID = 241

5d20h: ISAKMP (0:81): processing SA payload. message ID = 241

5d20h: ISAKMP (0:81): Checking IPSec proposal 1

5d20h: ISAKMP: transform 1, ESP_DES

5d20h: ISAKMP:   attributes in transform:

5d20h: ISAKMP:      SA life type in seconds

5d20h: ISAKMP:      SA life duration (VPI) of  0x0 0x0 0xD 0xAC

5d20h: ISAKMP:      SA life type in kilobytes

5d20h: ISAKMP:      SA life duration (VPI) of  0x0 0x10 0x0 0x0

5d20h: ISAKMP:      encaps is 2

5d20h: ISAKMP:      authenticator is HMAC-MD5

5d20h: ISAKMP (0:81): atts are acceptable.

5d20h: IPSEC(validate_proposal_request): proposal part #1,

(key eng. msg.) dest= 172.16.172.39, src= 172.16.172.21,

dest_proxy= 172.16.172.39/255.255.255.255/47/0 (type=1),

src_proxy= 172.16.172.21/255.255.255.255/47/0 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 0s and 0kb,

spi= 0x0(0), conn_id= 0, keysize= 0, flags= 0x0

5d20h: ISAKMP (0:81): processing NONCE payload. message ID = 241

5d20h: ISAKMP (0:81): processing ID payload. message ID = 241

5d20h: ISAKMP (81): ID_IPV4_ADDR src 172.16.172.21 prot 47 port 0

5d20h: ISAKMP (0:81): processing ID payload. message ID = 241

5d20h: ISAKMP (81): ID_IPV4_ADDR dst 172.16.172.39 prot 47 port 0

5d20h: ISAKMP (0:81): asking for 1 spis from ipsec

5d20h: IPSEC(key_engine): got a queue event...

5d20h: IPSEC(spi_response): getting spi 895566248 for SA

from 172.16.172.21   to 172.16.172.39   for prot 3

5d20h: ISAKMP: received ke message (2/1)

5d20h: ISAKMP (0:81): sending packet to 172.16.172.21 (R) QM_IDLE

5d20h: ISAKMP (0:81): received packet from 172.16.172.21 (R) QM_IDLE

5d20h: ISAKMP (0:81): Creating IPSec SAs

5d20h:         inbound SA from 172.16.172.21 to 172.16.172.39

(proxy 172.16.172.21 to 172.16.172.39)

5d20h:         has spi 0x356141A8 and conn_id 362 and flags 0

5d20h:         lifetime of 3500 seconds

5d20h:         lifetime of 1048576 kilobytes

5d20h:         outbound SA from 172.16.172.39   to 172.16.172.21

(proxy 172.16.172.39   to 172.16.172.21  )

5d20h:         has spi 337 and conn_id 363 and flags 0

5d20h:         lifetime of 3500 seconds

5d20h:         lifetime of 1048576 kilobytes

5d20h: ISAKMP (0:81): deleting node 241 error FALSE reason

"quick mode done (await()"

5d20h: IPSEC(key_engine): got a queue event...

5d20h: IPSEC(initialize_sas): ,

(key eng. msg.) dest= 172.16.172.39, src= 172.16.172.21,

dest_proxy= 172.16.172.39/0.0.0.0/47/0 (type=1),

src_proxy= 172.16.172.21/0.0.0.0/47/0 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 3500s and 1048576kb,

spi= 0x356141A8(895566248), conn_id= 362, keysize= 0, flags= 0x0

5d20h: IPSEC(initialize_sas): ,

(key eng. msg.) src= 172.16.172.39, dest= 172.16.172.21,

src_proxy= 172.16.172.39/0.0.0.0/47/0 (type=1),

dest_proxy= 172.16.172.21/0.0.0.0/47/0 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 3500s and 1048576kb,

spi= 0x151(337), conn_id= 363, keysize= 0, flags= 0x0

5d20h: IPSEC(create_sa): sa created,

(sa) sa_dest= 172.16.172.39, sa_prot= 50,

sa_spi= 0x356141A8(895566248),

sa_trans= esp-des esp-md5-hmac , sa_conn_id= 362

5d20h: IPSEC(create_sa): sa created,

(sa) sa_dest= 172.16.172.21, sa_prot= 50,

sa_spi= 0x151(337),

sa_trans= esp-des esp-md5-hmac , sa_conn_id= 363

5d20h: IPSEC(add_sa): peer asks for new SAs -- expire current in 120 sec.,

(sa) sa_dest= 172.16.172.21, sa_prot= 50,

sa_spi= 0x150(336),

sa_trans= esp-des esp-md5-hmac , sa_conn_id= 361,

(identity) local= 172.16.172.39, remote= 172.16.172.21,

local_proxy= 172.16.172.39/255.255.255.255/47/0 (type=1),

remote_proxy= 172.16.172.21/255.255.255.255/47/0 (type=1)

1720-1#

1720-1#show crypto isakmp sa

dst             src             state           conn-id    slot

172.16.172.39   172.16.172.21   QM_IDLE              81       0

1720-1#show crypto ipsec sa

interface: FastEthernet0

Crypto map tag: vpn, local addr. 172.16.172.39

local  ident (addr/mask/prot/port): (172.16.172.39/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (172.16.172.21/255.255.255.255/0/0)

current_peer: 172.16.172.21

PERMIT, flags={transport_parent,}

#pkts encaps: 0, #pkts encrypt: 0, #pkts digest 0

#pkts decaps: 0, #pkts decrypt: 0, #pkts verify 0

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0,

#pkts decompress failed: 0, #send errors 0, #recv errors 0

local crypto endpt.: 172.16.172.39, remote crypto endpt.: 172.16.172.21

path mtu 1514, media mtu 1514

current outbound spi: 0

inbound esp sas:

inbound ah sas:

inbound pcp sas:

outbound esp sas:

outbound ah sas:

outbound pcp sas:

local  ident (addr/mask/prot/port): (172.16.172.39/255.255.255.255/47/0)

remote ident (addr/mask/prot/port): (172.16.172.21/255.255.255.255/47/0)

current_peer: 172.16.172.21

PERMIT, flags={origin_is_acl,transport_parent,parent_is_transport,}

#pkts encaps: 34901, #pkts encrypt: 34901, #pkts digest 34901

#pkts decaps: 34900, #pkts decrypt: 34900, #pkts verify 34900

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0,

#pkts decompress failed: 0, #send errors 0, #recv errors 0

local crypto endpt.: 172.16.172.39, remote crypto endpt.: 172.16.172.21

path mtu 1500, media mtu 1500

current outbound spi: 151

inbound esp sas:

spi: 0x356141A8(895566248)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 362, flow_id: 163, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (1046258/3306)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x151(337)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 363, flow_id: 164, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (1046258/3306)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

interface: Tunnel0

Crypto map tag: vpn, local addr. 172.16.172.39

local  ident (addr/mask/prot/port): (172.16.172.39/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (172.16.172.21/255.255.255.255/0/0)

current_peer: 172.16.172.21

PERMIT, flags={transport_parent,}

#pkts encaps: 0, #pkts encrypt: 0, #pkts digest 0

#pkts decaps: 0, #pkts decrypt: 0, #pkts verify 0

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0,

#pkts decompress failed: 0, #send errors 0, #recv errors 0

local crypto endpt.: 172.16.172.39, remote crypto endpt.: 172.16.172.21

path mtu 1514, media mtu 1514

current outbound spi: 0

inbound esp sas:

inbound ah sas:

inbound pcp sas:

outbound esp sas:

outbound ah sas:

outbound pcp sas:

local  ident (addr/mask/prot/port): (172.16.172.39/255.255.255.255/47/0)

remote ident (addr/mask/prot/port): (172.16.172.21/255.255.255.255/47/0)

current_peer: 172.16.172.21

PERMIT, flags={origin_is_acl,transport_parent,parent_is_transport,}

#pkts encaps: 35657, #pkts encrypt: 35657, #pkts digest 35657

#pkts decaps: 35656, #pkts decrypt: 35656, #pkts verify 35656

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0,

#pkts decompress failed: 0, #send errors 0, #recv errors 0

local crypto endpt.: 172.16.172.39, remote crypto endpt.: 172.16.172.21

path mtu 1500, media mtu 1500

current outbound spi: 151

inbound esp sas:

spi: 0x356141A8(895566248)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 362, flow_id: 163, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (1046154/3302)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x151(337)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 363, flow_id: 164, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (1046154/3302)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

1720-1#show crypto engine connections active

ID Interface             IP-Address    State  Algorithm    Encrypt Decrypt

81 FastEthernet0  172.16.172.39   set  HMAC_MD5+DES_56_CB      0       0

362 FastEthernet0  172.16.172.39   set  HMAC_MD5+DES_56_CB      0   23194

363 FastEthernet0  172.16.172.39   set  HMAC_MD5+DES_56_CB  23195       0

تصحيح الأخطاء على مركز VPN 5002

يتم عرض إخراج Syslog على مركز VPN هنا.

VPN5002_8_323E9040: Main# VPN 0:1 opened for 172.16.172.39 from 172.16.172.39.

User assigned IP address 50.1.1.2

VPN5002_8_323E9040: Main#show vpn partner verbose

Port        Partner         Partner  Default  Bindto          Connect

Number      Address         Port     Partner  Address         Time

--------------------------------------------------------------------------

VPN 0:1     172.16.172.39   500      No       172.16.172.21   00:00:13:26

Auth/Encrypt: MD5e/DES  User Auth: Shared Key

Access: Static Peer: 172.16.172.39    Local: 172.16.172.21

Start:14518 seconds Managed:15299 seconds State:imnt_maintenance

IOP slot 1:

No active connections found.

VPN5002_8_323E9040: Main#show vpn statistics verbose

Current  In       High     Running  Script   Script   Script

Active   Negot    Water    Total    Starts   OK       Error

--------------------------------------------------------------

Users     0        0        0        0        0        0        0

Partners  1        0        1        81       81       1        158

Total     1        0        1        81       81       1        158

Stats             VPN0:1

Wrapped            79733

Unwrapped          79734

BadEncap               0

BadAuth                0

BadEncrypt             0

rx IP              79749

rx IPX                 0

rx Other               0

tx IP              79761

tx IPX                 0

tx Other               0

IKE rekey              0

Input VPN pkts dropped due to no SA: 0

Input VPN pkts dropped due to no free queue entries: 0

IOP slot 1:

Current  In       High     Running  Script   Script   Script

Active   Negot    Water    Total    Starts   OK       Error

--------------------------------------------------------------

Users     0        0        0        0        0        0        0

Partners  0        0        0        0        0        0        0

Total     0        0        0        0        0        0        0

Stats

Wrapped

Unwrapped

BadEncap

BadAuth

BadEncrypt

rx IP

rx IPX

rx Other

tx IP

tx IPX

tx Other

IKE rekey

Input VPN pkts dropped due to no SA: 0

Input VPN pkts dropped due to no free queue entries: 0

تشكيل خاطئ من نفق أسلوب

يقترح مركز VPN 5000 وضع النقل بشكل افتراضي عند إستخدام GRE عبر IPSec. عند تكوين موجه Cisco IOS بشكل غير صحيح لوضع النفق، تحدث هذه الأخطاء.

يتم عرض إخراج تصحيح الأخطاء على موجه Cisco IOS هنا.

2d21h: ISAKMP (0:23): Checking IPSec proposal 1

2d21h: ISAKMP: transform 1, ESP_DES

2d21h: ISAKMP: attributes in transform:

2d21h: ISAKMP: SA life type in seconds

2d21h: ISAKMP: SA life duration (VPI) of 0x0 0x1 0x51 0x80

2d21h: ISAKMP: SA life type in kilobytes

2d21h: ISAKMP: SA life duration (VPI) of 0x0 0x10 0x0 0x0

2d21h: ISAKMP: encaps is 2

2d21h: ISAKMP: authenticator is HMAC-MD5

2d21h: IPSEC(validate_proposal): invalid transform proposal flags -- 0x0

يظهر السجل على مركز VPN 5002 إدخالا مشابها لهذا المخرج.

lan-lan-VPN0:1:[172.16.172.39]: received notify from partner --

notify: NO PROPOSAL CHOSEN

معلومات ذات صلة

- إعلان نهاية المبيعات لسلسلة Cisco VPN 5000

- صفحة دعم مركز Cisco VPN 5000

- صفحة دعم عميل Cisco VPN 5000

- صفحة دعم IPSec

- الدعم الفني - Cisco Systems